Record size, Kbytes

0 200 400 600 800 1000 1200 1400

Bandwidth, Mbytes/sec

14

14.5

15

15.5

16

16.5

One SCSI device writing performance (with fdatasync)

Record size, Kbytes

10^4 10^5

Bandwidth, Mbytes/sec

14

14.5

15

15.5

16

16.5

One SCSI device writing performance (with fdatasync)