-4 -2 0 2 4

-150

-100

-50

0

50 Chi2 / ndf = 15.53 / 37 14.73 ± p0 = -117.9 0.05398 ± p1 = -0.08075 0.0595 ± p2 = -0.3865

Graph_{Chi2 / ndf = 15.53 / 37} ± ± ±