z coordinate of beam

-15 -10 -5 0 5 10 15 0 0.001

0.002

0.003

0.004

0.005

0.006

0.007

0.008

Efficiency_a3 Nent = 0 Mean = -1.27 RMS = 10.53 Chi2 / ndf = 15.95 / 6 Prob = 0.01405 p0 = 0.005623 +- 0.0001727 p1 = -7.267e-005 +- 1.175e p2 = 4.015e-006 +- 1.255e-

Efficiency APD 3 pin_down_right versus z coordinate of beam

z coordinate of beam

-15 -10 -5 0 5 10 15 0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

Efficiency_a2 Nent = 0 Mean = -1.507 RMS = 10.68 Chi2 / ndf = 28.12 / 6 Prob = 8.929e-005 p0 = 0.02417 +- 0.0003644 p1 = -0.000373 +- 2.516e-0 p2 = 2.797e-005 +- 2.72e-0

Efficiency APD 2 pin_down_left versus z coordinate of beam