TGeoBBox fDX fDY fDZ fOrigin[3] fgIsA

TGeoBBox TGeoBBox TGeoBBox TGeoBBox ComputeBBox ComputeNormal Contains CouldBeCrossed DistancetoPrimitive DistToOut DistToIn Divide GetAxisName GetAxisRange GetBoundingCylinder GetByteCount GetFittingBox GetMakeRuntimeShape GetDX GetDY GetDZ GetOrigin

InspectShape IsCylType IsValidBox IsNullBox Make3DBuffer Paint PaintNext Safety SetBoxDimensions SetDimensions SetBoxPoints SetPoints SetPoints Sizeof3D Class Class_Name IsA ShowMembers Streamer StreamerNVirtual

TGeoTube fRmin fRmax fDz fgIsA

TGeoTube TGeoTube TGeoTube TGeoTube ComputeBBox ComputeNormal ComputeNormalS Contains DistToOutS DistToOut DistToInS DistToIn DistToTube DistancetoPrimitive Divide GetAxisName GetAxisRange GetBoundingCylinder GetByteCount GetMakeRuntimeShape GetRmin

GetRmax GetDz InspectShape IsCylType Make3DBuffer Paint PaintNext Safety SafetyS SetTubeDimensions SetDimensions SetPoints SetPoints Sizeof3D Class Class_Name IsA ShowMembers Streamer StreamerNVirtual

TGeoTubeSeg fPhi1 fPhi2 fgIsA

DistToPhiMin TGeoTubeSeg TGeoTubeSeg TGeoTubeSeg TGeoTubeSeg ComputeBBox ComputeNormal ComputeNormalS Contains DistancetoPrimitive DistToOutS DistToOut DistToInS DistToIn Divide GetAxisRange GetBoundingCylinder GetByteCount GetMakeRuntimeShape GetPhi1 GetPhi2 InspectShape Make3DBuffer Paint PaintNext Safety SafetyS SetTubsDimensions SetDimensions SetPoints SetPoints Sizeof3D Class Class_Name IsA ShowMembers Streamer StreamerNVirtual

TGeoCtub fNlow[3] fNhigh[3] fgIsA

TGeoCtub TGeoCtub TGeoCtub TGeoCtub ComputeBBox ComputeNormal Contains DistToOut DistToIn Divide GetAxisRange GetByteCount GetMakeRuntimeShape GetNlow GetNhigh GetZcoord InspectShape Safety SetCtubDimensions SetDimensions SetPoints SetPoints Class Class_Name IsA ShowMembers Streamer StreamerNVirtual