TGeoNodeCache

fGeoCacheUsageRatio fGeoCacheMaxDaughters fGeoCacheMaxSize fGeoCacheDefaultLevel fGeoCacheMaxLevels fGeoCacheObjArrayInd fGeoCacheStackSize fLevel fPath fStack fSize fNused fDefaultLevel fTopNode fCount fCountLimit fCurrentNode fCurrentCache fCurrentIndex fBranch fMatrices fStackLevel fGlobalMatrix fCache fMatrixPool fgIsA

TGeoNodeCache TGeoNodeCache AddNode CacheId CdCache CdDown CdTop CdUp CleanCache ClearDaughter ClearNode Compact DeleteCaches DumpNodes GetBranch GetMatrices GetCurrentMatrix GetCurrentNode GetMother GetNode GetStackLevel GetTopNode GetLevel GetFreeSpace GetMatrixPool GetNfree GetNused GetPath

GetNodeId GetSize GetUsageCount IncreasePool IncrementUsageCount Index LocalToMaster MasterToLocal LocalToMasterVect MasterToLocalVect LocalToMasterBomb MasterToLocalBomb PrintNode PushState PopState PopState PopDummy Refresh SetDefaultLevel SetPersistency Status Class Class_Name IsA ShowMembers Streamer StreamerNVirtual

TGeoCacheDummy fTop fNode fMatrix fMatrixBranch fNodeBranch fgIsA

TGeoCacheDummy TGeoCacheDummy CdDown CdTop CdUp CleanCache ClearDaughter ClearNode Compact DeleteCaches DumpNodes GetBranch GetCurrentMatrix GetCurrentNode GetFreeSpace GetMatrices GetMother GetNode GetNfree GetNused GetPath

GetNodeId GetUsageCount IncreasePool IncrementUsageCount LocalToMaster MasterToLocal LocalToMasterVect MasterToLocalVect LocalToMasterBomb MasterToLocalBomb PrintNode Refresh SetPersistency Status Class Class_Name IsA ShowMembers Streamer StreamerNVirtual